hhhh hhhh

glutTimerFunc(3GLUT) GLUT (3.5) glutTimerFunc(3GLUT)

NAME

glutTimerFunc - registers a timer callback to be triggered in a specified number of milliseconds.

SYNTAX

void glutTimerFunc(unsigned int msecs, void (*func)(int value), value);

ARGUMENTS

msecs Number of milliseconds to pass before calling the callback.

func The timer callback function.

value Integer value to pass to the timer callback.

DESCRIPTION

glutTimerFunc registers the timer callback func to be triggered in at least msecs milliseconds. The value parameter to the timer callback will be the value of the value parameter to glutTimerFunc. Multiple timer callbacks at same or differing times may be registered simultaneously.

The number of milliseconds is a lower bound on the time before the callback is generated. GLUT attempts to deliver the timer callback as soon as possible after the expiration of the callback’s time interval.

There is no support for canceling a registered callback. Instead, ignore a callback based on its value parameter when it is triggered.

SEE ALSO

glutIdleFunc

AUTHOR

Mark J. Kilgard (mjk@sgi.com)

Page 1 July 23, 1997

hhhh hhhh