hhhh hhhh

glutSolidOctahedron(3GLUT) GLUT (3.5) glutSolidOctahedron(3GLUT)

NAME

glutSolidOctahedron, glutWireOctahedron - render a solid or wireframe octahedron (8-sided regular solid) respectively.

SYNTAX

void glutSolidOctahedron(void); void glutWireOctahedron(void);

DESCRIPTION

glutSolidOctahedron and glutWireOctahedron render a solid or wireframe octahedron respectively centered at the modeling coordinates origin with a radius of 1.0.

SEE ALSO

glutSolidSphere, glutSolidCube, glutSolidCone, glutSolidTorus, glutSolidDodecahedron, glutSolid- Tetrahedron, glutSolidIcosahedron, glutSolidTeapot

AUTHOR

Mark J. Kilgard (mjk@sgi.com)

Page 1 July 23, 1997

hhhh hhhh